-.75&-0.254&-0.247&-0.250&0.011&0.011&0.011&0.011&0.011&0.011&0.011&0.011&0.011\\
-.5&-0.253&-0.247&-0.251&0.011&0.011&0.011&0.011&0.011&0.011&0.011&0.011&0.011\\
-.25&-0.251&-0.246&-0.250&0.011&0.011&0.011&0.011&0.011&0.011&0.011&0.012&0.011\\
0&-0.250&-0.247&-0.250&0.011&0.011&0.011&0.011&0.011&0.011&0.011&0.012&0.011\\
.25&-0.249&-0.247&-0.250&0.011&0.011&0.011&0.011&0.011&0.011&0.011&0.011&0.011\\
.5&-0.247&-0.247&-0.250&0.011&0.011&0.011&0.011&0.011&0.012&0.012&0.012&0.012\\
.75&-0.245&-0.246&-0.249&0.011&0.011&0.011&0.011&0.011&0.011&0.012&0.012&0.011\\
