-.75&-2.635&-1.489&-2.492&0.136&0.084&0.155&0.129&0.102&0.147&0.186&1.017&0.147\\
-.5&-2.598&-1.490&-2.508&0.136&0.084&0.156&0.134&0.105&0.148&0.166&1.016&0.148\\
-.25&-2.545&-1.483&-2.501&0.137&0.084&0.156&0.145&0.110&0.159&0.152&1.023&0.159\\
0&-2.499&-1.485&-2.490&0.136&0.084&0.155&0.137&0.106&0.150&0.137&1.020&0.150\\
.25&-2.446&-1.481&-2.494&0.136&0.084&0.156&0.140&0.111&0.157&0.150&1.025&0.157\\
.5&-2.403&-1.480&-2.502&0.137&0.084&0.156&0.134&0.102&0.154&0.165&1.025&0.154\\
.75&-2.357&-1.491&-2.500&0.136&0.084&0.155&0.133&0.106&0.156&0.195&1.015&0.156\\
