-.75&-0.368&-0.247&-0.257&0.023&0.026&0.057&0.024&0.028&0.057&0.120&0.028&0.057\\
-.5&-0.329&-0.246&-0.253&0.023&0.026&0.056&0.024&0.028&0.057&0.082&0.028&0.057\\
-.25&-0.289&-0.249&-0.251&0.023&0.026&0.057&0.023&0.028&0.056&0.046&0.028&0.056\\
0&-0.249&-0.247&-0.249&0.023&0.026&0.057&0.022&0.026&0.059&0.022&0.026&0.059\\
.25&-0.212&-0.249&-0.254&0.023&0.026&0.056&0.024&0.028&0.057&0.045&0.028&0.058\\
.5&-0.171&-0.248&-0.248&0.023&0.026&0.057&0.023&0.027&0.059&0.083&0.027&0.059\\
.75&-0.132&-0.248&-0.245&0.023&0.026&0.057&0.024&0.026&0.057&0.121&0.026&0.058\\
