-.75&-1.736&-0.992&-1.046&0.125&0.150&0.347&0.128&0.170&0.345&0.747&0.170&0.348\\
-.5&-1.491&-0.984&-1.018&0.125&0.150&0.346&0.131&0.165&0.349&0.509&0.165&0.349\\
-.25&-1.245&-1.002&-1.005&0.125&0.150&0.347&0.129&0.164&0.340&0.277&0.164&0.340\\
0&-0.996&-0.993&-0.993&0.125&0.149&0.349&0.127&0.150&0.360&0.127&0.151&0.360\\
.25&-0.765&-1.008&-1.024&0.125&0.149&0.346&0.130&0.157&0.347&0.268&0.157&0.348\\
.5&-0.506&-0.995&-0.985&0.125&0.149&0.348&0.126&0.152&0.356&0.510&0.152&0.357\\
.75&-0.264&-0.999&-0.971&0.125&0.149&0.349&0.129&0.142&0.355&0.747&0.142&0.356\\
