-.75&-0.251&-0.250&-0.250&0.010&0.010&0.010&0.010&0.010&0.010&0.010&0.010&0.010\\
-.5&-0.250&-0.250&-0.250&0.010&0.010&0.010&0.010&0.010&0.010&0.010&0.010&0.010\\
-.25&-0.251&-0.250&-0.250&0.010&0.010&0.010&0.010&0.010&0.010&0.010&0.010&0.010\\
0&-0.250&-0.250&-0.250&0.010&0.010&0.010&0.011&0.011&0.011&0.011&0.011&0.011\\
.25&-0.250&-0.250&-0.250&0.010&0.010&0.010&0.011&0.011&0.011&0.011&0.011&0.011\\
.5&-0.250&-0.250&-0.250&0.010&0.010&0.010&0.011&0.011&0.011&0.011&0.011&0.011\\
.75&-0.249&-0.250&-0.250&0.010&0.010&0.010&0.010&0.011&0.010&0.011&0.011&0.010\\
