-.75&-0.206&-0.200&-0.200&0.010&0.010&0.010&0.010&0.011&0.011&0.012&0.011&0.011\\
-.5&-0.204&-0.199&-0.199&0.010&0.010&0.010&0.009&0.010&0.010&0.010&0.010&0.010\\
-.25&-0.202&-0.200&-0.199&0.010&0.010&0.010&0.009&0.010&0.010&0.010&0.010&0.010\\
0&-0.200&-0.200&-0.200&0.010&0.010&0.010&0.009&0.009&0.010&0.009&0.009&0.010\\
.25&-0.197&-0.199&-0.199&0.010&0.010&0.010&0.010&0.010&0.010&0.010&0.010&0.010\\
.5&-0.196&-0.200&-0.200&0.010&0.010&0.010&0.010&0.009&0.010&0.011&0.009&0.010\\
.75&-0.193&-0.200&-0.199&0.010&0.010&0.010&0.009&0.009&0.010&0.012&0.009&0.010\\
