0 10 20 30 40 50 60 60

80

100

120

* *

* *

Normalized Diameter (%)

Time (min)

FluoZin3 (n = 12) Lysotracker (n = 12)

TPEN

(c)

0 10 20 30 40 50 60 60

80

100

120

* * * *** ** ** **

Normalized Intensity (%)

Time (min)

FluoZin3 (n = 12) Lysotracker (n = 12)

TPEN

(a) 60’

(b)

0 15’ 40’

36’ 60’

(d)

0 12’