0 10 20 30 40 50 60

80

100

120

Normalized Diameter (%)

Time (min)

Control (n = 13) TPEN (n = 13) *** (c)

0 10 20 30 40 50 60

80

100

120

Normalized Intensity (%)

Time (min)

Control (n = 13) TPEN (n = 13) ***

630 nm

0 30’ 45’ (a)

(d)

40’ 25’ 10’ 0 (b)

100’ 70’ 60’

0 20 40 60 80 100 60

80

100

120

* *** **

Normalized Intensity (%)

Time (mins)

TPEN

0 20 40 60 80 100 60

80

100

120

**

Normalized Diameter (%)

Time (mins)

TPEN **

0 (e)

(f) (g)