Citalopram Hydrobromide, C20 H22 F N2 O Br (11bmb_3760)   Hist  1
Lambda 0.4137 A, L-S cycle 1540          Obsd. and Diff. Profiles

Scaling:  8.7(  5.0X)  15.4( 20.0X)

    2gH, deg

Counts

 5.0    10.0    15.0    20.0    25.0

X10u 4

 0.0

 0.5

 1.0